SELECT statsd.add_timing('127.0.0.1', 8125, 'test-timing1', 70);
SELECT statsd.add_timing('127.0.0.1', 8125, 'test-timing1', 50);
SELECT statsd.increment_counter('127.0.0.1', 8125, 'test-counter-1');
SELECT statsd.increment_counter('127.0.0.1', 8125, 'test-counter-1');
SELECT statsd.increment_counter('127.0.0.1', 8125, 'test-counter-1');
SELECT statsd.increment_counter('127.0.0.1', 8125, 'test-counter-1');
SELECT statsd.increment_counter('127.0.0.1', 8125, 'test-counter-1');
SELECT statsd.increment_counter('127.0.0.1', 8125, 'test-counter-1');
SELECT statsd.increment_counter('127.0.0.1', 8125, 'test-counter-1');
SELECT statsd.set_gauge('127.0.0.1', 8125, 'test-gauge', 98);
