DROP FUNCTION resetseq_sequence_max_value(oid);
DROP FUNCTION resetseq_reset_sequences_in_table(regclass);
DROP FUNCTION resetseq_reset_sequences_in_schema(name);
DROP FUNCTION resetseq_reset_sequences_in_database();
DROP TYPE resetseq_report_type;
