---
title: 0.24.3
noindex: true
---

## Stability Improvements 💪

- Eagerly abort an index build when it will not fit on disk, failing fast instead of exhausting disk space.
- Cap index build worker memory at 1GB to reduce peak memory usage during index creation.
- Bound sequential scan memory usage by spilling to a `BufFile`.
- Use the correct cardinality estimate when routing `GROUP BY` between Tantivy and DataFusion.
- Return an error instead of silently returning incomplete results when Tantivy truncates results.

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.24.3).
