---
title: 0.22.1
noindex: true
---

## Stability Improvements 💪

- Fix support for casts of aggregate functions in aggregate scan target lists.
- Allow for disabling aggregate scan planner warnings with `SET paradedb.check_aggregate_scan TO off;`.
- Enable the join scan in more cases.

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.22.1).
