---
title: 0.21.9
noindex: true
---

## Stability Improvements 💪

- Fixed a rare issue where an exit code `1` from a parallel worker during a custom scan could cause the leader to hang

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.21.9).
