---
title: 0.21.15
noindex: true
---

## Stability Improvements 💪

- Fixed `ReadBuffer` errors from stale ctids after `VACUUM` truncation
- Fixed RLS policies that get planned as `SubPlan`s

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.21.15).
