---
title: 0.21.12
noindex: true
---

## Performance Improvements 🚀

- Eliminated clones in the aggregate custom scan, resulting in 100x+ speedup in cases which large numbers of output rows

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.21.12).
