---
title: 0.21.11
noindex: true
---

## Stability Improvements 💪

- Added more interrupt points to the aggregate custom scan so that long-running queries can be more easily cancelled

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.21.11).
