---
title: 0.19.7
noindex: true
---

## Stability Improvements 💪

- Fixed a bug where large `CREATE INDEX` statements could deadlock/hang
- Fixed a bug where prepared statements with `pdb.score` could error after multiple executions

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.19.7).
