---
title: 0.19.10
noindex: true
---

## Stability Improvements 💪

- In ParadeDB Enterprise, fixed a bug where a temporary corruption error would be thrown if a read happened concurrently with a vacuum on the primary

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.19.10).
