---
title: 0.18.9
noindex: true
---

## Performance Improvements 🚀

- Top K queries that request `paradedb.score` but do not order by `paradedb.score` still get a Top K scan,
  which significantly improves performance

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.18.9).
