---
title: 0.18.8
noindex: true
---

## Stability Improvements 💪

- Fixed a problem where `paradedb.snippet` and pushed down heap filters would produce empty results or not match in the presence of UPDATEs.

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.18.8).
