---
title: 0.18.6
noindex: true
---

## Stability Improvements 💪

- Fixed a calculation bug in our merge policy which could lead to segments larger than the configured layer sizes being merged

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.18.6).
