---
title: 0.17.9
noindex: true
---

## Stability Improvements 💪

- Improved background merging byte size estimates, so that the index is merged down closer to `paradedb.target_segment_count`

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.17.9).
