---
title: 0.17.6
noindex: true
---

## Stability Improvements 💪

- Fixed an issue with the free space map where pages in the free space map were not being fully occupied

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.17.6).
