---
title: 0.17.5
noindex: true
---

## Stability Improvements 💪

- Fixed a write performance regression introduced in `0.17.4`
- Fixed an issue where parallel vacuums could fail when trying to add pages back to the free space map

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.17.5).
