---
title: 0.17.4
noindex: true
---

## Stability Improvements 💪

- Fixed a bug with the index free space map that caused pages to be incorrectly overwritten and corrupted

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.17.4).
