---
title: 0.17.12
noindex: true
---

## Stability Improvements 💪

- Fixed an issue where vacuums could cause background merging to happen even if background merging is disabled
- Added more verbose logging to `EXPLAIN ANALYZE VERBOSE` output of parallel custom scans

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.17.12).
