---
title: 0.16.5
noindex: true
---

## Stability Improvements 💪

- Fixes a bug where the relation size cache was not invalidated during relation extension, potentially causing read errors under high concurrency

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.16.5).
