---
title: 0.15.4
noindex: true
---

## Stability Improvements 💪

- Fixed an issue where the ICU tokenizer would get stuck in endless loop on long documents.

## Full Changelog

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.15.4).
