---
title: 0.15.16
noindex: true
---

## Stability Improvements 💪

- Fixed an issue where pages in the index were leaking and not being reused, leading to higher than expected growth in index size

## Full Changelog

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.15.16).
