---
title: 0.15.14
noindex: true
---

## Stability Improvements 💪

- In ParadeDB Enterprise, fixed an issue with physical replication where replicas could read the index in a "half-applied" state if a concurrent write
  was happening
- Fixed an issue where some "top N" queries would loop endlessly instead of returning

## Full Changelog

The full changelog is available [on the GitHub Release](https://github.com/paradedb/paradedb/releases/tag/v0.15.14).
