---
title: 0.18.2
---

This release is a no-op in community. It fixes some broken upgrade scripts in ParadeDB Enterprise that prevented a clean upgrade from `0.17.12` to `0.18.x`.

The full changelog is available [here](https://github.com/paradedb/paradedb/releases/tag/v0.18.2).
