---
title: 0.17.10
---

## Performance Improvements 🚀

- We have roughly 2Xed single-record update throughput as a result of improving lock contention and optimizing Tantivy's
  write path

## Stability Improvements 💪

- Fixed an error with the custom scan where subqueries that returned no results could cause a segfault or error message to be thrown

The full changelog is available [here](https://github.com/paradedb/paradedb/releases/tag/v0.17.10).
