-- Setup db content for tests of the functions.

-- Delete all the ISOK_RESULTS rows.
DELETE FROM isok_results;
-- Reset the sequence so what the previous tests did is ignored.
SELECT setval('isok_results_irid_seq', 1, FALSE);


