--  citus--7.1-1--7.1-2

CREATE OR REPLACE FUNCTION pg_catalog.citus_version()
    RETURNS text
    LANGUAGE C STABLE STRICT
    AS 'MODULE_PATHNAME', $$citus_version$$;
COMMENT ON FUNCTION pg_catalog.citus_version()
    IS 'Citus version string';
