create function pg_relation_size_nolock(oid) returns int64 language c
as 'tblsize', 'pg_relation_size_nolock_oid';
create function pg_total_relation_size_nolock(oid) returns bigint language c
as 'tblsize', 'pg_total_relation_size_nolock_oid';
